\setlength{\parindent}{0pt}
\setlength{\parskip}{1em}

\newcommand\minp[1]{\glsref[minp_symbol]{f_{#1}}}
\newcommand\height{\glsref[height_symbol]{H}}

\newcommand\mahler{\glsref[mahler_symbol]{M}}

\renewcommand\O{\mathcal{O}}

\DeclareMathOperator{\ord}{ord}
